MASS CONCENTRATION �g/m3

12 14 17 20 23 26 29 1 1 7 13 19 25 1 7 13 19 25 11 17 23 29 0 100 200 300 400 500 600 700 800

APRIL-MAY JULY OCTOBER JANUARY

FINE PARTICLES

OUTDOOR

CAVE 6

CAVE 9

0 100 200 300 400 500 600 700 800 900 1000

1100

1200

1300

1400

COARSE PARTICLES

OUTDOOR

CAVE 6

CAVE 9