SO2 CONCENTRATION (ppb)

12 14 17 20 23 26 29 1 1 7 13 19 25 1 7 13 19 25 11 17 23 29 0 10 20 30 40 50 60 70 80 90 100 110 120 130

APRIL-MAY JULY OCTOBER JANUARY

OUTDOOR

CAVE 6

CAVE 9